Cape Keppel Beach, Queensland (CKB)
23°28.535S 150°03.971E -23.475581° 151.066180° VAR 10°E
Procedures
RWY 12/30, 850 metres long, 15 metres wide, grass
Elevation 10ft AMSL
CTAF 132.20 MHz
FIA BRISBANE CENTRE 119.55 MT ALMA
850m
12
30
YGLA
150°M
25NM
YBUD
132°M
110NM
YBRK
270°M
33NM
YOSN
202°M
25NM
YBAF
147°M
267NM
YBLE
199°M
59NM
Airstrip Road
Document Metadata	Cape Keppel Beach (CKB)
hosted at: https://system-f.gitlab.io/documentation/miscellaneous
source hosted at: https://gitlab.com/system-f/documentation/miscellaneous
last updated at time: 2025-11-21 04:13:34 UTC by Tony Morris <tonymorris@gmail.com>
revision: 04f62baa9b6349a20e84923537d48f4f1ef6d4a0
access control: public