The Old Station, Queensland (YOSN)
23°49.289S 150°49.532E -23.821489° 150.825531° VAR 9.4°E
Procedures
RWY 06/24, 2000 metres long, 18 metres wide, grass
Elevation 147ft AMSL
CTAF 126.7, Ground 121.6, UHF 18
AVGAS available at the refuelling shed
FIA BRISBANE CENTRE 119.55
2000m
06
24
Building
Fuel
Aircraft
Parking
Langmorn Road
River
River
YGLA
088°M
22NM
YBRK
314°M
33NM
YBAF
143°M
254NM
YBLE
196°M
34NM
Document Metadata	The Old Station (YOSN)
hosted at: https://system-f.gitlab.io/documentation/miscellaneous
source hosted at: https://gitlab.com/system-f/documentation/miscellaneous
last updated at time: 2025-11-21 04:13:34 UTC by Tony Morris <tonymorris@gmail.com>
revision: 04f62baa9b6349a20e84923537d48f4f1ef6d4a0
access control: public